[[integration-tests.stop-goal]]
= `spring-boot:stop`

`org.springframework.boot:spring-boot-maven-plugin:3.3.0-SNAPSHOT`

Stop an application that has been started by the "start" goal. Typically invoked once a test suite has completed.



[[integration-tests.stop-goal.optional-parameters]]
== Optional parameters

[cols="3,2,3"]
|===
| Name | Type | Default

| xref:#integration-tests.stop-goal.parameter-details.jmx-name[jmxName]
| `String`
| `org.springframework.boot:type=Admin,name=SpringApplication`

| xref:#integration-tests.stop-goal.parameter-details.jmx-port[jmxPort]
| `int`
| `9001`

| xref:#integration-tests.stop-goal.parameter-details.skip[skip]
| `boolean`
| `false`

|===



[[integration-tests.stop-goal.parameter-details]]
== Parameter details



[[integration-tests.stop-goal.parameter-details.jmx-name]]
=== `jmxName`
The JMX name of the automatically deployed MBean managing the lifecycle of the application.

[cols="10h,90"]
|===

| Name
| `jmxName`

| Type
| `java.lang.String`

| Default value
| `org.springframework.boot:type=Admin,name=SpringApplication`

| User property
|

| Since
|

|===


[[integration-tests.stop-goal.parameter-details.jmx-port]]
=== `jmxPort`
The port to use to look up the platform MBeanServer.

[cols="10h,90"]
|===

| Name
| `jmxPort`

| Type
| `int`

| Default value
| `9001`

| User property
|

| Since
|

|===


[[integration-tests.stop-goal.parameter-details.skip]]
=== `skip`
Skip the execution.

[cols="10h,90"]
|===

| Name
| `skip`

| Type
| `boolean`

| Default value
| `false`

| User property
| ``spring-boot.stop.skip``

| Since
| `1.3.2`

|===
